Booger Bob is a booger that lives inside our nose.

Should Bob accidentally slip out, he might just land on one of our toes.

Sometimes we feel the need to pick Bob out, but if Bob isn’t willing to leave, we pick and pick at him some more.

When we finally get him, many of us then fling Bob onto the floor.

Are you one of those people who roll Bob up into a ball?

Then take rolled up Bob between your fingers and fling him against a wall.

What if Bob was stuck to your finger and you couldn’t fling him off, would you rub Bob onto your sleeve?

Do you think that Booger Bob will just disappear and evaporate or that he’s make-believe?

1. Page 4