This is a story about a pig named Millie who hated getting dirty.

Millie lives on a farm with her mom and dad, her brothers and sisters, and her aunt Girty.

A pig that doesn’t like being in mud and dirt is unnatural,
says Millie’s Brother Billy.

But that’s how it was for this unique, super clean pig
named Millie.

Millie was allergic to dust and dirt, it made her eyes watery and also made her sneeze.

Her brothers and her sisters made fun of Millie who was frequently teased.

Millie did everything possible to remain exceptionally clean.

The farmer’s wife, who took care of the pigs, thought Millie
was the cleanest pig she had ever seen.

1. Start